DISCOVERY OF THE HIGGS BOSON

Jane Gutschmutz, Sam Ting, Joseph Whatcrock University of Tuktoyaktuk

Abel Tofindit, Joy Totheworld Nootka Sound Community College

The first run of the SMORGASBORD detector at the Tuktoyaktuk Superconducting SuperCollider has recently been completed. The detector and the accelerator will be briefly described. Details on calibration and operation of our unique abacus will be disclosed. Preliminary analysis of data from this first run indicates the presence of a non-Standard Model Higgs Boson resulting from technidilaton decay. Details on the Higgs mass and production cross-section will be discussed.